FIXED
Shift-JIS:LF
HEAD_RECORD,1,,String,300,
RECORD_KUBUN_HEAD,1,,String,1,
HYOBI1,1,,String,44,
DATA_SKSI_YMD,1,,String,6,
COMP_CD_HEAD,1,,String,6,
HYOBI2,1,,String,243,
DATA_RECORD_HEAD,1,,String,300,
RECORD_KUBUN_DATA,1,,String,1,
DYOBI1,1,,String,14,
COMP_CD_DATA,1,,String,6,
DYOBI2,1,,String,19,
KIKAI_TRAN_DATE,1,,String,12,
WORK_KUBUN,1,,String,3,
DYOBI3,1,,String,60,
HAPIE_NO,1,,String,19,
DYOBI4,1,,String,56,
FUYO_POINT,1,,String,8,
DYOBI5,1,,String,31,
ERRAR_CODE,1,,String,4,
DYOBI6,1,,String,67,
TORERA,1,,String,300,
RECORD_KUBUN_TR,1,,String,1,
TYOBI1,1,,String,44,
DATA_CNT,1,,String,8,
AMNT_HUYO_POINT,1,,String,8,
TYOBI2,1,,String,239,
END,1,,String,300,
RECORD_KUBUN_END,1,,String,1,
EYOBI1,1,,String,299,
